Peavey Rockmaster Preamp Retube Kits

The Peavey Rockmaster Preamps use the exact same tube lineup and power tube combinations. The kits we offer here are the most distinctive in tonal character, forged from many years of research. Every kit is configured to provide a specific sound/experience.

The Standard Retube Kit is as close to OEM as possible. Maintaining the amps stock level of headroom and gain while providing a warm but even handed overall sound. The kit includes four Standard JJ ECC83S’s for V1 – V2 – V3 – V4.

The Gold Pin Retube Kit uses the JJ ECC83S Gold Pin variants to provide a smoother, creamier, and more singing overall sound. This option is less aggressive and has less “teeth” when driven hard. If you like a classic raunchy gritty overdriven tone, we recommend looking to the Standard or High Gain option. If sweet, open, and more refined is what you’re after this kit will do it. The kit includes four Standard Gold Pin JJ ECC83S’s for V1 – V2 – V3 – V4.

The High Gain Retube Kit uses our hand picked high gain selected JJ ECC83S’s. If you’re looking for maximum crunch and grind this is where you want to be. Sonically this setup is very similar to our Standard Retube Kit but with a little extra gain on tap. The kit includes four Standard Handpicked High Gain JJ ECC83S’s for V1 – V2 – V3 – V4.

The post Peavey Rockmaster Preamp Retube Kits appeared first on Eurotubes.